ALTER TABLE "NICEPORTAL"."UO_CRM_DATA_CONTRACTS" ADD ("RESPONSE_STATUS" VARCHAR(50));
ALTER TABLE "NICEPORTAL"."UO_CRM_DATA_CONTRACTS" ADD ("RESPONSE_MESSAGE" NCLOB MEMORY THRESHOLD 1000);